VERSION 1.0 CLASS
BEGIN
  MultiUse = -1  'True
END
Attribute VB_Name = "DFWizardClass"
Attribute VB_Creatable = True
Attribute VB_Exposed = True
Attribute VB_Description = "Data Form Designer"
Dim AddInItems As Object    'VBIDE.MenuItems
Dim DFDMenu As Object       'VBIDE.MenuLine
Dim ConnectID As Long

'------------------------------------------------------
'this method adds the Add-In to the VB menu
'it is called by the VB addin manager
'------------------------------------------------------
Sub ConnectAddIn(VBInst As VBIDE.Application)
  On Error GoTo error_handler
    
  Set gobjIDEAppInst = VBInst
  Set AddInItems = VBInst.AddInMenu.MenuItems
  Set DFDMenu = AddInItems.Add("Data Form Wizard...")
  ConnectID = DFDMenu.ConnectEvents(Me)
 
  Exit Sub
    
error_handler:
  MsgBox Err.Description
  Exit Sub
    
End Sub

'------------------------------------------------------
'this method removes the Add-In from the VB menu
'it is called by the VB addin manager
'------------------------------------------------------
Sub DisconnectAddIn(ByVal mode As Integer)
  'Disconnect the event handler
  DFDMenu.DisconnectEvents ConnectID
  'remove it from the menu
  AddInItems.Remove DFDMenu
End Sub

'------------------------------------------------------
'this is the method that is executed when the user
'selects the Add-In from the VB menu
'------------------------------------------------------
Sub AfterClick()
  'load and show the form
  frmDFD.Show vbModal
End Sub
